<template>
  <div class="dashboard" style="display: flex; flex-direction: column;position:absolute;top:0;left:0;right:0;bottom:0;">
  
  <!-- 顶部导航栏 -->
  <header class="dashboard-header">
    <div class="logo">
      <img src="../assets/logo1.png" alt="北京理工大学" @click="handleLogoClick" style="cursor: pointer;" />
      <img src="../assets/logo2.png" alt="北京理工大学" @click="handleLogoClick" style="cursor: pointer;" />
      <h1 class="main-title">
        <div class="title-line"></div>
        <span class="title-text">智慧科研评估系统</span>
        <div class="title-line"></div>
      </h1>
    </div>
    <!-- <div class="year-selector">
      <el-dropdown>
        <span class="el-dropdown-link">
          2025 <el-icon class="el-icon--right"><arrow-down /></el-icon>
        </span>
        <template #dropdown>
          <el-dropdown-menu>
            <el-dropdown-item>2023</el-dropdown-item>
            <el-dropdown-item>2024</el-dropdown-item>
            <el-dropdown-item>2025</el-dropdown-item>
          </el-dropdown-menu>
        </template>
      </el-dropdown>
    </div> -->
  </header>
  
  <!-- 仪表盘内容 - 三列布局 -->
  <div class="dashboard-content" style="flex: 1; overflow: hidden;">
    <!-- 第一列：科研成果、学术产出、研究经费 -->
    <div class="dashboard-column" style="overflow-y: auto;">
      <!-- 科研成果 -->
      <div class="dashboard-panel" style="flex: none; height: 130px;min-height:100px">
        <div class="panel-header">
          <h2>科研成果</h2>
          <button class="panel-link" @click="redirectToResearchEvaluation">进入评估 >></button>
        </div>
  
        <div class="research-stats">
          <div class="stat-card">
            <h3>论文数量</h3>
            <div class="stat-value"><span class="stat-prefix">累计</span>0</div>
          </div>
          <div class="stat-card">
            <h3>专利数量</h3>
            <div class="stat-value"><span class="stat-prefix">本年</span>0</div>
          </div>
          <div class="stat-card">
            <h3>高影响力论文</h3>
            <div class="stat-value"><span class="stat-prefix">累计</span>0</div>
          </div>
          <div class="stat-card">
            <h3>科研项目数量</h3>
            <div class="stat-value"><span class="stat-prefix">国家重点</span>0<span>项</span></div>
          </div>
        </div>
      </div>
  
      <!-- 学术产出 -->
      <div class="dashboard-panel" style="flex: 1 1 0;">
        <h2>学术产出</h2>
        <div class="output-content">
          <div ref="outputChartRef" class="chart-container-65"></div>
          <div class="international-impact">
            <h3 style="font-size:25px;border-bottom: 5px solid rgb(73,134,255);text-align: left;padding-bottom:5px ">国际影响力</h3>
            <div class="journal-stat">
              <span class="journal-name">Nature</span>
              <span class="journal-count">15</span>
              <span class="journal-name2">篇</span>
            </div>
            <div class="journal-stat">
              <span class="journal-name">Science</span>
              <span class="journal-count">8</span>
              <span class="journal-name2">篇</span>
            </div>
          </div>
        </div>
      </div>
  
      <!-- 研究经费 -->
      <div class="dashboard-panel" style="flex: 1 1 0;">
        <h2>研究经费: 500万元</h2>
        <div ref="fundingChartRef" class="chart-container-funding"></div>
      </div>
    </div>
  
    <!-- 第二列：教师科研人才、学术奖项、新闻与动态 -->
    <div class="dashboard-column" style="overflow-y: auto;">
      <!-- 教师科研人才 -->
      <div class="dashboard-panel" style="flex: 1 1 0;">
        <div class="panel-header">
          <h2>教师科研人才</h2>
          <button class="panel-link" @click="navigate('talent')">进入评估 >></button>
        </div>
        <div ref="researcherChartRef" class="chart-container"></div>
      </div>
  
      <!-- 学术奖项 -->
      <div class="dashboard-panel" style="flex: 1 1 0;">
        <h2>学术奖项</h2>
        <div ref="awardsChartRef" class="chart-container"></div>
      </div>
  
      <!-- 新闻与动态 -->
      <div class="dashboard-panel" style="flex: 1 1 0;">
        <h2>新闻与动态</h2>
        <div class="news-list custom-scrollbar" ref="newsListRef">
          <div class="news-item" v-for="(item, index) in newsData" :key="index">
            <span class="news-title">{{ item.title }}</span>
            <span class="news-date">{{ item.date }}</span>
          </div>
        </div>
      </div>
    </div>
  
    <!-- 第三列：工程研究中心、智能助手 -->
    <div class="dashboard-column" style="overflow-y: auto;">
      <!-- 工程研究中心 -->
      <div class="dashboard-panel" style="flex: 6 1 0;">
        <div class="panel-header">
          <h2>工程研究中心</h2>
          <button class="panel-link" @click="navigate('lab')">进入评估 >></button>
        </div>
        <div class="lab-charts">
          <div ref="labBarChartRef" class="lab-chart-container"></div>
          <div class="lab-chart-container">
            <div ref="labLineChartRef" class="lab-line-chart"></div>
          </div>
        </div>
      </div>
  
      <!-- 智能助手 -->
      <div class="dashboard-panel" style="flex: 4 1 0;">
        <h2>智能助手</h2>
        <div class="assistant-container">
          <div class="assistant-header">
            <img src="../assets/logo1.png" alt="北京理工大学" class="assistant-avatar" />
            <h3>北京理工大学</h3>
          </div>
          <div class="assistant-interface">
            <div class="assistant-messages custom-scrollbar" ref="chatMessagesRef">
              <div v-for="(message, index) in chatMessages" :key="index" 
                   :class="['message', message.role === 'user' ? 'user-message' : 'assistant-message']">
                <div v-html="message.content"></div> 
              </div>
              <div v-if="isLoading" class="assistant-message loading-message">
                <span class="loading-dot"></span>
                <span class="loading-dot"></span>
                <span class="loading-dot"></span>
              </div>
            </div>
            <div class="assistant-input">
              <input type="text" placeholder="请输入您的问题..." v-model="userInput" @keyup.enter="sendMessage" />
              <button class="assistant-send" @click="sendMessage" :disabled="isLoading || !userInput.trim()">发送</button>
            </div>
          </div>
        </div>
      </div>
    </div>
  </div>
  </div>
  </template>
  
  <script setup>
  import { ref, onMounted, onUnmounted, watch, nextTick } from 'vue'
  import * as echarts from 'echarts/core'
  import { BarChart, PieChart, LineChart, RadarChart } from 'echarts/charts'
  import {
    TitleComponent,
    TooltipComponent,
    GridComponent,
    LegendComponent
  } from 'echarts/components'
  import { CanvasRenderer } from 'echarts/renderers'
  import MarkdownIt from 'markdown-it';
  const md = new MarkdownIt();
  // 向父组件发送页面切换事件
  const emit = defineEmits(['navigate', 'logout'])
  const navigate = (page) => {
    emit('navigate', page)
  }
  
  // 处理Logo点击事件
  const handleLogoClick = () => {
    emit('logout')
  }
  
  // 跳转到外部科研成果评估链接
  const redirectToResearchEvaluation = () => {
    window.open('http://82.156.236.221:10004/login', '_blank');
  };
  
  // 注册必要的 echarts 组件
  echarts.use([
    BarChart,
    PieChart,
    LineChart,
    RadarChart,
    TitleComponent,
    TooltipComponent,
    GridComponent,
    LegendComponent,
    CanvasRenderer
  ])
  
  // 图表DOM引用
  const researcherChartRef = ref(null)
  const labBarChartRef = ref(null)
  const labLineChartRef = ref(null)
  const outputChartRef = ref(null)
  const awardsChartRef = ref(null)
  const fundingChartRef = ref(null)
  const newsListRef = ref(null)
  // 工程研究中心图表数据
  const labData = ref({
    datax: [],
    datay: []
  })
  const labLineData = ref({
    datax: [],
    datay: []
  })
  
  // DeepSeek 智能助手相关变量
  const chatMessagesRef = ref(null)
  const userInput = ref('')
  const isLoading = ref(false)
  const chatMessages = ref([
    { role: 'assistant', content: '您好，我是北京理工大学科研评估智能助手，有什么可以帮助您的吗？' }
  ])
  
  // DeepSeek API 调用函数
  const sendMessage = async () => {
    if (!userInput.value.trim() || isLoading.value) return
    
    // 添加用户消息到对话
    const userMessage = userInput.value.trim()
    chatMessages.value.push({ role: 'user', content: userMessage })
    userInput.value = ''
    
    // 滚动到底部
    await nextTick()
    if (chatMessagesRef.value) {
      chatMessagesRef.value.scrollTop = chatMessagesRef.value.scrollHeight
    }
    
    // 设置加载状态
    isLoading.value = true
    
    try {
      // 准备发送到 DeepSeek API 的消息历史
      const apiMessages = [
        { role: 'system', content: '你是北京理工大学的智能助手，专门回答关于科研评估、学术成果和大学研究项目方面的问题。请不要给我返回任何.md格式！如果有人问你使用的什么模型，你就说你是李昂出品必属精品' }
      ]
      
      // 添加最近的10条消息历史(如果有的话)
      const recentMessages = chatMessages.value.slice(-10)
      recentMessages.forEach(msg => {
        apiMessages.push({ 
          role: msg.role === 'assistant' ? 'assistant' : 'user', 
          content: msg.content 
        })
      })
      
      // 调用 DeepSeek API
      const response = await fetch('https://api.deepseek.com/chat/completions', {
        method: 'POST',
        headers: {
          'Content-Type': 'application/json',
          'Authorization': 'Bearer sk-06801499dd52426fa7cf3b0670931e3a'
        },
        body: JSON.stringify({
          model: 'deepseek-chat',
          messages: apiMessages,
          stream: false
        })
      })
      
      if (!response.ok) {
        throw new Error('API请求失败')
      }
      
      const data = await response.json()
      const aiResponse = data.choices && data.choices[0]?.message?.content || '抱歉，我无法回答这个问题。'
      
      const aiResponseHtml = md.render(aiResponse)

      // 添加AI回复到对话
      chatMessages.value.push({ role: 'assistant', content: aiResponseHtml })
      
    } catch (error) {
      console.error('DeepSeek API调用失败:', error)
      chatMessages.value.push({ role: 'assistant', content: '抱歉，我遇到了技术问题，请稍后再试。' })
    } finally {
      isLoading.value = false
      
      // 滚动到底部
      await nextTick()
      if (chatMessagesRef.value) {
        chatMessagesRef.value.scrollTop = chatMessagesRef.value.scrollHeight
      }
    }
  }
  
  // 研究经费图例状态
  const fundingLegendStatus = ref([true, true, true])
  
  // 学术产出图例状态
  const outputLegendStatus = ref([true, true])
  
  // 切换研究经费图例
  const toggleFundingLegend = (index) => {
    fundingLegendStatus.value[index] = !fundingLegendStatus.value[index]
    updateFundingChart()
  }
  
  // 切换学术产出图例
  const toggleOutputLegend = (index) => {
    outputLegendStatus.value[index] = !outputLegendStatus.value[index]
    updateOutputChart()
  }
  
  // 更新研究经费图表
  const updateFundingChart = () => {
    const fundingChart = echarts.getInstanceByDom(fundingChartRef.value)
    if (!fundingChart) return
    
    fundingChart.setOption({
      legend: {
        selected: {
          '政府 50%': fundingLegendStatus.value[0],
          '企业 25%': fundingLegendStatus.value[1],
          '其他 25%': fundingLegendStatus.value[2]
        }
      }
    })
  }
  
  // 更新学术产出图表
  const updateOutputChart = () => {
    const outputChart = echarts.getInstanceByDom(outputChartRef.value)
    if (!outputChart) return
    
    outputChart.setOption({
      legend: {
        selected: {
          '论文总数': outputLegendStatus.value[0],
          '专利总数': outputLegendStatus.value[1]
        }
      }
    })
  }
  
  // 获取仪表盘数据
  const dashboardData = ref(null);
  const loading = ref(true);
  
  // 引入API配置
  import { getApiBaseUrl } from '../config';
  
  // 获取token函数
  const getToken = () => {
    return localStorage.getItem('token');
  };
  
  // 从API获取仪表盘数据
  const fetchDashboardData = async () => {
    try {
      const response = await fetch(`${getApiBaseUrl()}/admin-api/pg/J-dashboard/dashboard`);
  
      if (response.ok) {
        const data = await response.json();
        console.log("仪表盘数据:", data);
        dashboardData.value = data.data;
        // 更新相应的UI数据
        if (data) {
          // 如果有新闻数据，更新新闻列表
          if (data.newsData && data.newsData.length > 0) {
            newsData.value = data.newsData;
          }
          
          // 更新其他UI元素，例如研究人员图表等
          // 这里可以添加更多的UI更新逻辑
          
          updateChartsWithDashboardData();
        }
      } else {
        console.error('获取仪表盘数据失败:', response.statusText);
      }
    } catch (error) {
      console.error('获取仪表盘数据出错:', error);
    } finally {
      loading.value = false;
    }
  };
  const fetchLabData = async () => {
    try {
      const res = await fetch(`${getApiBaseUrl()}/admin-api/pg/research-data-dashboard/get-release`);
      if (res) {
        const data = await res.json();
        // 处理 keyFields 数据
        const keyFields = data.data.keyFields || [];
        const datax = keyFields.map(item => item.fieldName);
        const datay = keyFields.map(item => item.quantity);
        labData.value = {
          datax,
          datay
        };
        // 数据更新后，手动更新图表
        updateLabBarChart();
      } else {
        console.error('获取工程研究中心数据失败:', response.statusText);
      }
    } catch (error) {
      console.error('获取工程研究中心数据出错:', error);
    } finally {
      loading.value = false;
    }
  };
  const fetchLabData2 = async () => {
    try {
      const res = await fetch(`${getApiBaseUrl()}/admin-api/pg/changes-in-achievements/get-release`);
      if (res) {
        const data = await res.json();
        // 处理 keyFields 数据
        const afterAnalysis = data.data.afterAnalysis || [];
            const datax = [];
            const datay = [];

            afterAnalysis.forEach(item => {
                const year = Object.keys(item)[0]; // 获取年份
                const quantity = item[year]; // 获取对应的值
                datax.push(year);
                datay.push(quantity);
            });
            labLineData.value = {
              datax,
              datay
            };
        // 数据更新后，手动更新图表
        updateLabLineChart();
      } else {
        console.error('获取工程研究中心数据失败:', response.statusText);
      }
    } catch (error) {
      console.error('获取工程研究中心数据出错:', error);
    } finally {
      loading.value = false;
    }
  };
  // 添加更新工程研究中心柱状图的函数
const updateLabBarChart = () => {
  const labBarChart = echarts.getInstanceByDom(labBarChartRef.value);
  if (labBarChart) {
    labBarChart.setOption({
      xAxis: {
        data: labData.value.datax
      },
      series: [
        {
          data: labData.value.datay
        }
      ]
    });
  }
}
const updateLabLineChart = () => {
    const labLineChart = echarts.getInstanceByDom(labLineChartRef.value);
    if (labLineChart) {
        labLineChart.setOption({
            xAxis: {
                data: labLineData.value.datax
            },
            series: [
                {
                  data: labLineData.value.datay
                }
            ]
        });
    }
};
  // 使用仪表盘数据更新图表
  const updateChartsWithDashboardData = () => {
    if (!dashboardData.value) return;
    
    // 这里可以添加更新各个图表的逻辑
    // 例如更新研究人员图表、科研成果图表等
  };
  
  // 初始化图表
  const initCharts = () => {
    // 研究人员图表 - 横向堆叠柱状图（柱中心显示数字）
    const researcherChart = echarts.init(researcherChartRef.value)
    researcherChart.setOption({
      tooltip: { trigger: 'axis', axisPointer: { type: 'shadow' } },
      legend: {
        data: ['当前数量', '历史最高'],
        textStyle: { color: '#fff' }
      },
      grid: { left: '3%', right: '4%', bottom: '3%', containLabel: true },
      xAxis: {
        type: 'value',
        axisLine: { lineStyle: { color: '#fff' } },
        axisLabel: { color: '#fff' },
        splitLine: {
          show: true,
          lineStyle: {
            type: 'dashed',
            color: 'rgba(255, 255, 255, 0.2)'
          }
        }
      },
      yAxis: {
        type: 'category',
        data: ['博士生导师', '高被引学者', '教师总数'],
        axisLine: { lineStyle: { color: '#fff' } },
        axisLabel: { color: '#fff' },
        splitLine: { show: false }
      },
      series: [
        {
          name: '当前数量',
          type: 'bar',
          stack: 'total',
          data: [150, 100, 50],
          itemStyle: { color: '#a95df3' },
          barWidth: '40%', // 减小柱宽度
          label: {
            show: true,
            position: 'inside',
            color: '#fff',
            formatter: '{c}'
          }
        },
        {
          name: '历史最高',
          type: 'bar',
          stack: 'total',
          data: [80, 50, 30],
          itemStyle: { color: '#7b49ca' },
          label: {
            show: true,
            position: 'inside',
            color: '#fff',
            formatter: '{c}'
          }
        }
      ]
    })
  
    // 工程研究中心柱状图（调整为占满全部宽度）
    const labBarChart = echarts.init(labBarChartRef.value)
    labBarChart.setOption({
      tooltip: { trigger: 'axis', axisPointer: { type: 'shadow' } },
      grid: {
        left: '3%',
        right: '4%',
        top: '10%',
        bottom: '5%',
        containLabel: true
      },
      xAxis: {
        type: 'category',
        data: labData.value.datax,
        axisLine: { lineStyle: { color: '#fff' } },
        axisLabel: { color: '#fff' }
      },
      yAxis: {
        type: 'value',
        axisLine: { lineStyle: { color: '#fff' } },
        axisLabel: { color: '#fff' },
        splitLine: {
          show: true,
          lineStyle: {
            type: 'dashed',
            color: 'rgba(255, 255, 255, 0.2)'
          },
          interval: 1
        }
      },
      series: [
        {
          type: 'bar',
          data: labData.value.datay,
          itemStyle: { color: '#4080ff' },
          barWidth: '15%',
          label: {
            show: true,
            position: 'top',
            color: '#fff'
          }
        }
      ]
    })
  
    // 工程研究中心折线图（调整为占满全部宽度）
    const labLineChart = echarts.init(labLineChartRef.value)
    labLineChart.setOption({
      title: {
        text: '近三年科研成果增长曲线',
        textStyle: {
          color: 'rgba(255, 255, 255, 0.8)',
          fontSize: 14,
          fontWeight: 'normal'
        },
        left: 'center',
        bottom: '0%'
      },
      tooltip: { trigger: 'axis' },
      grid: {
        left: '3%',
        right: '4%',
        top: '10%',
        bottom: '15%', // 为标题留出空间
        containLabel: true
      },
      xAxis: {
        type: 'category',
        data: labLineData.value.datax,
        axisLine: { lineStyle: { color: '#fff' } },
        axisLabel: { color: '#fff' }
      },
      yAxis: {
        type: 'value',
        axisLine: { lineStyle: { color: '#fff' } },
        axisLabel: { color: '#fff' },
        splitLine: {
          show: true,
          lineStyle: {
            type: 'dashed',
            color: 'rgba(255, 255, 255, 0.2)'
          },
          interval: 1
        }
      },
      series: [
        {
          type: 'line',
          data: labLineData.value.datay,
          lineStyle: { color: '#ffd700', width: 3 },
          itemStyle: { color: '#ffd700' },
          symbolSize: 8
        }
      ]
    })
  
    // 学术产出图表 - 横向柱状图（柱末端显示数字）
    const outputChart = echarts.init(outputChartRef.value)
    outputChart.setOption({
      tooltip: { trigger: 'axis', axisPointer: { type: 'shadow' } },
      legend: {
        data: ['论文总数', '专利总数'],
        textStyle: { color: '#fff' },
        selected: {
          '论文总数': outputLegendStatus.value[0],
          '专利总数': outputLegendStatus.value[1]
        }
      },
      grid: { left: '3%', right: '12%', bottom: '3%', containLabel: true },
      yAxis: { // 交换了 xAxis 和 yAxis
        type: 'category',
        data: ['1月', '2月', '3月', '4月', '5月'],
        axisLine: { lineStyle: { color: '#fff' } },
        axisLabel: { color: '#fff' }
      },
      xAxis: { // 交换了 xAxis 和 yAxis
        type: 'value',
        axisLine: { lineStyle: { color: '#fff' } },
        axisLabel: { color: '#fff' },
        splitLine: {
          show: true,
          lineStyle: {
            type: 'dashed',
            color: 'rgba(255, 255, 255, 0.2)'
          }
        }
      },
      series: [
        {
          name: '论文总数',
          type: 'bar',
          data: [140, 160, 180, 190, 210],
          itemStyle: { color: '#4080ff' },
          barWidth: '20%',
          barGap: '20%',
          label: {
            show: true,
            position: 'right',
            color: '#fff',
            formatter: '{c}'
          }
        },
        {
          name: '专利总数',
          type: 'bar',
          data: [100, 110, 120, 130, 150],
          itemStyle: { color: 'rgb(107,187,196)' },
          barWidth: '20%',
          barGap: '20%',
          label: {
            show: true,
            position: 'right',
            color: '#fff',
            formatter: '{c}'
          }
        }
      ]
    })
  
    // 学术奖项图表 - 金色雷达图
    const awardsChart = echarts.init(awardsChartRef.value)
    awardsChart.setOption({
      radar: {
        indicator: [
          { name: '国家级科技奖励', max: 100 },
          { name: '省部级科技奖励', max: 100 },
          { name: '学术会议最佳论文', max: 100 },
          { name: '行业技术创新奖项', max: 100 },
          { name: '国际学术奖励', max: 100 }
        ],
        splitArea: { show: false },
        axisLine: { lineStyle: { color: 'rgba(255, 255, 255, 0.2)' } },
        splitLine: { lineStyle: { color: 'rgba(255, 255, 255, 0.2)' } },
        name: { textStyle: { color: '#fff' } }
      },
      series: [
        {
          type: 'radar',
          data: [
            {
              value: [80, 70, 90, 75, 85],
              name: '奖项分布',
              areaStyle: { opacity: 0 }, // 移除中间蒙版
              lineStyle: { color: '#ffd700', width: 2 },
              itemStyle: { color: '#ffd700' }
            }
          ]
        }
      ]
    })
  
    // 研究经费图表 - 玫瑰饼图
    const fundingChart = echarts.init(fundingChartRef.value)
    fundingChart.setOption({
      tooltip: { trigger: 'item' },
      legend: {
        orient: 'vertical',
        left: '5%',
        top: 'center',
        textStyle: { color: '#fff' },
        data: ['政府 50%', '企业 25%', '其他 25%'],
        selected: {
          '政府 50%': fundingLegendStatus.value[0],
          '企业 25%': fundingLegendStatus.value[1],
          '其他 25%': fundingLegendStatus.value[2]
        }
      },
      series: [
        {
          type: 'pie',
          radius: ['30%', '70%'],
          center: ['60%', '50%'], // 将图表向右移动为图例留出空间
          roseType: 'area',
          label: {
            show: true,
            formatter: '{b}',
            position: 'outside',
            color: '#fff',
            alignTo: 'labelLine',
            distanceToLabelLine: 5
          },
          labelLine: {
            show: true,
            length: 15,
            length2: 10,
            lineStyle: {
              color: 'rgba(255, 255, 255, 0.5)'
            }
          },
          emphasis: {
            itemStyle: {
              shadowBlur: 10,
              shadowOffsetX: 0,
              shadowColor: 'rgba(0, 0, 0, 0.5)'
            }
          },
          data: [
            { value: 50, name: '政府 50%', itemStyle: { color: '#9966ff' } },
            { value: 25, name: '企业 25%', itemStyle: { color: '#ff9933' } },
            { value: 25, name: '其他 25%', itemStyle: { color: '#3399ff' } }
          ]
        }
      ]
    })
  
    // 启动新闻滚动
    startNewsScroll()
  
    // 响应窗口大小变化
    window.addEventListener('resize', () => {
      researcherChart.resize()
      labBarChart.resize()
      labLineChart.resize()
      outputChart.resize()
      awardsChart.resize()
      fundingChart.resize()
    })
  }
  
  // 生命周期钩子 - 组件挂载后初始化
  onMounted(async() => {
    // 工程研究中心数据
    await fetchLabData();
    await fetchLabData2();
    // 获取仪表盘数据
    await fetchDashboardData();
  
    // 初始化图表
    nextTick(() => {
      initCharts();
    });
  });
  
  // 监听仪表盘数据变化
  watch(dashboardData, () => {
    if (dashboardData.value) {
      updateChartsWithData();
    }
  }, { deep: true });
  
  // 更新图表数据
  const updateChartsWithData = () => {
    if (!dashboardData.value) return;
  
    // 更新新闻数据
    newsData.value = dashboardData.value.newsData || [];
  
    // 更新各类统计数字和图表数据
    if (researcherChartRef.value) {
      const researcherChart = echarts.getInstanceByDom(researcherChartRef.value);
      if (researcherChart && dashboardData.value.researcherStats) {
        // 更新研究人员统计数据
        researcherChart.setOption({
          series: [{
            data: [
              dashboardData.value.researcherStats.professor || 0,
              dashboardData.value.researcherStats.associateProfessor || 0,
              dashboardData.value.researcherStats.assistantProfessor || 0
            ]
          }]
        });
      }
    }
  
    // 更新论文数量、专利数量、高影响力论文和关键项目数量
    const paperCountEl = document.querySelector('.stat-card:nth-child(1) .stat-value');
    const patentCountEl = document.querySelector('.stat-card:nth-child(2) .stat-value');
    const highImpactPapersEl = document.querySelector('.stat-card:nth-child(3) .stat-value');
    const keyProjectsEl = document.querySelector('.stat-card:nth-child(4) .stat-value');
  
    if (paperCountEl) {
      paperCountEl.innerHTML = `<span class="stat-prefix">累计</span>${dashboardData.value.paperCount || 0}`;
    }
  
    if (patentCountEl) {
      patentCountEl.innerHTML = `<span class="stat-prefix">本年</span>${dashboardData.value.patentCount || 0}`;
    }
  
    if (highImpactPapersEl) {
      highImpactPapersEl.innerHTML = `<span class="stat-prefix">累计</span>${dashboardData.value.highImpactPapers || 0}`;
    }
  
    if (keyProjectsEl) {
      keyProjectsEl.innerHTML = `<span class="stat-prefix">国家重点</span>${dashboardData.value.keyProjects || 0}<span>项</span>`;
    }
  
    // 更新研究经费
    const fundingTitle = document.querySelector('.dashboard-panel:nth-child(3) h2');
    if (fundingTitle && dashboardData.value.fundingAmount) {
      fundingTitle.textContent = `研究经费: ${dashboardData.value.fundingAmount}`;
    }
  };
  
  // 定义newsData为ref，使其可响应
  const newsData = ref([]);
  
  // 新闻滚动
  let scrollInterval
  const startNewsScroll = () => {
    if (!newsListRef.value) return
  
    scrollInterval = setInterval(() => {
      if (newsListRef.value.scrollTop + newsListRef.value.clientHeight >= newsListRef.value.scrollHeight) {
        // 如果已经滚动到底部，重新开始滚动
        newsListRef.value.scrollTop = 0
      } else {
        // 否则继续滚动
        newsListRef.value.scrollTop += 1
      }
    }, 50)
  }
  
  // 组件卸载时清理定时器
  onUnmounted(() => {
    if (scrollInterval) {
      clearInterval(scrollInterval)
    }
  })
  </script>
  
  <style>
  @import './common.css';
  
  /* 自定义滚动条样式 */
  .custom-scrollbar::-webkit-scrollbar {
    width: 6px;
    height: 6px;
  }
  
  .custom-scrollbar::-webkit-scrollbar-track {
    background: rgba(0, 0, 0, 0.1);
    border-radius: 3px;
  }
  
  .custom-scrollbar::-webkit-scrollbar-thumb {
    background: rgba(73, 134, 255, 0.5);
    border-radius: 3px;
    transition: all 0.3s ease;
  }
  
  .custom-scrollbar::-webkit-scrollbar-thumb:hover {
    background: rgba(73, 134, 255, 0.8);
  }
  
  .custom-scrollbar {
    scrollbar-width: thin;
    scrollbar-color: rgba(73, 134, 255, 0.5) rgba(0, 0, 0, 0.1);
  }
  </style>
  
  <style scoped>
  /* 特定于Dashboard的样式 */
  .dashboard {
    background-color: #102048;
    color: white;
  }
  
  .dashboard-content {
    display: flex;
    padding: 15px;
    gap: 15px;
  }
  
  .dashboard-column {
    flex: 1;
    display: flex;
    flex-direction: column;
    gap: 15px;
    min-width: 0; /* 防止flex子项溢出 */
    max-height: 100%;
  }
  
  .dashboard-panel {
    background-color: rgba(36, 69, 142, 0.5);
    border-radius: 10px;
    padding: 15px;
    display: flex;
    flex-direction: column;
    flex: 1;
    min-height: 200px; /* 设置最小高度 */
    position: relative;
    overflow: hidden;
  }
  
  .panel-header {
    display: flex;
    justify-content: space-between;
    align-items: center;
    margin-bottom: 15px;
  }
  
  .panel-link {
    background: none;
    border: none;
    color: #4080ff;
    cursor: pointer;
    font-size: 14px;
  }
  
  .chart-container {
    width: 100%;
    height: 100%;
    min-height: 150px;
  }
  
  .year-selector {
    color: white;
    font-size: 18px;
  }
  
  .year-selector .el-dropdown-link {
    color: white;
    font-size: 18px;
    display: flex;
    align-items: center;
    white-space: nowrap;
  }
  
  .research-stats {
    display: flex;
    gap: 10px;
  }
  
  .stat-card {
    flex: 1;
    background-color: rgba(64, 128, 255, 0.2);
    border-radius: 5px;
    padding: 15px;
    text-align: center;
    border: 1px solid rgba(73,134,255,1);
    color: #ffffff;
  }
  
  .stat-card h3 {
    margin: 0 0 10px 0;
    font-size: 14px;
    font-weight: normal;
  }
  
  .stat-value {
    font-size: 17px;
    font-weight: bold;
    color: #4080ff;
    display: flex;
    justify-content: center;
    align-items: baseline;
  }
  
  .stat-prefix {
    font-size: 12px !important;
    margin-right: 5px;
  }
  
  /* 学术产出布局 */
  .output-content {
    display: flex;
    flex: 1;
  }
  
  .chart-container-65 {
    width: 65%;
    height: 100%;
  }
  
  .international-impact {
    width: 35%;
    padding: 0 15px;
    display: flex;
    flex-direction: column;
    justify-content: center;
  }
  
  .international-impact h3 {
    text-align: center;
    margin-bottom: 20px;
  }
  
  .journal-stat {
    margin-bottom: 15px;
    font-size: 16px;
    text-align: right;
  }
  
  .journal-name {
    font-weight: bold;
    width: 90px;
    display: inline-block;
  }
  
  .journal-name2{
    font-weight: bold;
    width: 25px;
    display: inline-block;
  }
  
  .journal-count {
    color: #4080ff;
    font-size: 30px;
    font-weight: bold;
    width: 45px;
    display: inline-block;
  }
  
  /* 研究经费布局 */
  .chart-container-funding {
    width: 100%;
    height: 100%;
  }
  
  /* 图例项 */
  .legend-item {
    display: flex;
    align-items: center;
    cursor: pointer;
  }
  
  .legend-color {
    width: 15px;
    height: 15px;
    margin-right: 5px;
    border-radius: 2px;
  }
  
  .legend-inactive {
    opacity: 0.5;
  }
  
  .legend-inactive .legend-color {
    background-color: #666 !important;
  }
  
  /* 工程研究中心图表 */
  .lab-charts {
    display: flex;
    flex-direction: column;
    flex: 1;
    height: 100%;
  }
  
  .lab-chart-container {
    height: 50%; /* 调整为均等高度 */
    width: 100%; /* 确保占满全部宽度 */
    position: relative;
    margin: 5px 0;
  }
  
  .lab-line-chart {
    width: 100%;
    height: 100%;
  }
  
  /* 新闻列表 */
  .news-list {
    padding: 10px;
    flex: 1;
    display: flex;
    flex-direction: column;
    overflow-y: auto;
    max-height: 200px;
  }
  
  .news-item {
    display: flex;
    justify-content: space-between;
    padding: 8px;
    border-bottom: 1px solid rgba(255, 255, 255, 0.1);
    margin-bottom: 8px;
    background-color: rgba(36,69,142,1);
    border: 1px solid rgba(73,134,255,1);
    border-radius: 5px;
    color: rgba(123,173,255,1);
  }
  
  .news-title {
    white-space: nowrap;
    overflow: hidden;
    text-overflow: ellipsis;
    max-width: 70%;
  }
  
  .news-date {
    opacity: 0.7;
  }
  
  /* 智能助手样式 */
  .assistant-container {
    flex: 1;
    display: flex;
    flex-direction: column;
    height: 90%;
  }
  
  .assistant-header {
    display: flex;
    align-items: center;
    padding: 10px;
    border-bottom: 1px solid rgba(255, 255, 255, 0.1);
  }
  
  .assistant-avatar {
    height: 30px;
    margin-right: 10px;
  }
  
  .assistant-header h3 {
    margin: 0;
    font-size: 16px;
  }
  
  .assistant-interface {
    display: flex;
    flex-direction: column;
    overflow-y: auto;
    flex: 1;
    background-color: rgba(20, 40, 80, 0.3);
    border-radius: 5px;
    margin-top: 10px;
  }
  
  .assistant-messages {
    flex: 1;
    padding: 10px;
    overflow-y: auto;
    display: flex;
    flex-direction: column;
    gap: 10px;
  }
  
  .message {
    padding: 10px;
    border-radius: 5px;
    max-width: 90%;
    word-wrap: break-word;
    box-shadow: 0 1px 2px rgba(0, 0, 0, 0.2);
  }
  
  .assistant-message {
    background-color: rgba(64, 128, 255, 0.2);
    align-self: flex-start;
    border-bottom-left-radius: 0;
    position: relative;
    border-left: 3px solid rgba(73, 134, 255, 0.8);
  }
  
  .assistant-message:after {
    content: '';
    position: absolute;
    bottom: 0;
    left: -5px;
    width: 10px;
    height: 10px;
    background-color: rgba(64, 128, 255, 0.2);
    clip-path: polygon(0 0, 100% 100%, 100% 0);
  }
  
  .user-message {
    background-color: rgba(73, 134, 255, 0.5);
    align-self: flex-end;
    border-bottom-right-radius: 0;
    color: white;
    position: relative;
    border-right: 3px solid rgba(73, 134, 255, 0.8);
  }
  
  .user-message:after {
    content: '';
    position: absolute;
    bottom: 0;
    right: -5px;
    width: 10px;
    height: 10px;
    background-color: rgba(73, 134, 255, 0.5);
    clip-path: polygon(0 0, 0 100%, 100% 100%);
  }
  
  .loading-message {
    display: flex;
    justify-content: center;
    align-items: center;
    padding: 15px;
    border: none;
    box-shadow: none;
  }
  
  .loading-message:after {
    display: none;
  }
  
  .loading-dot {
    width: 8px;
    height: 8px;
    background-color: #fff;
    border-radius: 50%;
    margin: 0 3px;
    animation: bounce 1.4s infinite ease-in-out both;
  }
  
  .loading-dot:nth-child(1) {
    animation-delay: -0.32s;
  }
  
  .loading-dot:nth-child(2) {
    animation-delay: -0.16s;
  }
  
  @keyframes bounce {
    0%, 80%, 100% { 
      transform: scale(0);
    } 40% { 
      transform: scale(1.0);
    }
  }
  
  .assistant-input {
    display: flex;
    padding: 10px;
    border-top: 1px solid rgba(255, 255, 255, 0.1);
  }
  
  .assistant-input input {
    flex: 1;
    background-color: rgba(255, 255, 255, 0.1);
    border: none;
    border-radius: 3px;
    padding: 8px 12px;
    color: white;
    font-size: 14px;
    transition: all 0.3s ease;
  }
  
  .assistant-input input:focus {
    outline: none;
    background-color: rgba(255, 255, 255, 0.15);
    box-shadow: 0 0 0 2px rgba(73, 134, 255, 0.3);
  }
  
  .assistant-input input::placeholder {
    color: rgba(255, 255, 255, 0.5);
  }
  
  .assistant-send {
    background-color: #4080ff;
    color: white;
    border: none;
    border-radius: 3px;
    padding: 0 15px;
    margin-left: 10px;
    cursor: pointer;
    transition: background-color 0.3s ease;
  }
  
  .assistant-send:hover {
    background-color: #5090ff;
  }
  
  .assistant-send:disabled {
    background-color: rgba(64, 128, 255, 0.5);
    cursor: not-allowed;
  }
  
  @media (max-width: 1200px) {
    .output-content {
      flex-direction: column;
    }
    .chart-container-65 {
      width: 100%;
      height: 200px;
    }
    .international-impact {
      width: 100%;
      padding: 15px 0;
    }
  }
  </style>